IsoValue -1.06728 -0.99056 -0.913844 -0.837129 -0.760413 -0.683698 -0.606982 -0.530266 -0.453551 -0.376835 -0.30012 -0.223404 -0.146689 -0.0699729 0.00674265 0.0834582 0.160174 0.236889 0.313605 0.390321

Initial shape, Compliance 39.994, Volume 95