IsoValue -0.575254 -0.533905 -0.492556 -0.451207 -0.409858 -0.368508 -0.327159 -0.28581 -0.244461 -0.203112 -0.161762 -0.120413 -0.0790641 -0.0377149 0.00363424 0.0449834 0.0863326 0.127682 0.169031 0.21038

Iteration 3, Compliance =40.4839, Volume=97.4728