IsoValue -1.11791 -0.891521 -0.665131 -0.438741 -0.212351 0.014039 0.240429 0.466819 0.693209 0.919599 1.14599 1.37238 1.59877 1.82516 2.05155 2.27794 2.50433 2.73072 2.95711 3.1835

Initial shape, Compliance 40.2772, Volume 95