IsoValue -0.810031 -0.645991 -0.48195 -0.317909 -0.153868 0.0101726 0.174213 0.338254 0.502295 0.666336 0.830376 0.994417 1.15846 1.3225 1.48654 1.65058 1.81462 1.97866 2.1427 2.30674

Iteration 3, Compliance =40.9801, Volume=97.1895