IsoValue -0.786389 -0.630643 -0.474897 -0.31915 -0.163404 -0.00765733 0.148089 0.303835 0.459582 0.615328 0.771075 0.926821 1.08257 1.23831 1.39406 1.54981 1.70555 1.8613 2.01705 2.17279

Iteration 3, Compliance =40.7272, Volume=97.2045