IsoValue -1.07895 -0.88346 -0.687971 -0.492482 -0.296993 -0.101504 0.0939847 0.289474 0.484963 0.680451 0.87594 1.07143 1.26692 1.46241 1.6579 1.85338 2.04887 2.24436 2.43985 2.63534

Initial shape, Compliance 40.4833, Volume 95