IsoValue -0.718179 -0.588056 -0.457933 -0.32781 -0.197687 -0.067564 0.0625589 0.192682 0.322805 0.452928 0.58305 0.713173 0.843296 0.973419 1.10354 1.23366 1.36379 1.49391 1.62403 1.75416

Iteration 3, Compliance =40.0943, Volume=97.5915