IsoValue -1.06979 -0.875479 -0.681171 -0.486862 -0.292553 -0.0982441 0.0960647 0.290374 0.484682 0.678991 0.8733 1.06761 1.26192 1.45623 1.65054 1.84484 2.03915 2.23346 2.42777 2.62208

Initial shape, Compliance 40.5437, Volume 95