IsoValue -0.778215 -0.636865 -0.495516 -0.354166 -0.212817 -0.0714675 0.069882 0.211232 0.352581 0.493931 0.63528 0.77663 0.917979 1.05933 1.20068 1.34203 1.48338 1.62473 1.76608 1.90743

Iteration 3, Compliance =39.9705, Volume=97.4932