IsoValue -1.03358 -0.74121 -0.448844 -0.156478 0.135888 0.428254 0.72062 1.01299 1.30535 1.59772 1.89008 2.18245 2.47482 2.76718 3.05955 3.35191 3.64428 3.93665 4.22901 4.52138

Iteration 3, Compliance =35.497, Volume=93.4835