IsoValue -0.191823 -0.137562 -0.0833018 -0.0290411 0.0252196 0.0794803 0.133741 0.188002 0.242262 0.296523 0.350784 0.405044 0.459305 0.513566 0.567827 0.622087 0.676348 0.730609 0.784869 0.83913

Iteration 101, Compliance =17.3794, Volume=95.0236