IsoValue -0.191982 -0.137676 -0.0833706 -0.0290651 0.0252404 0.0795459 0.133851 0.188157 0.242462 0.296768 0.351073 0.405379 0.459684 0.51399 0.568295 0.622601 0.676906 0.731212 0.785517 0.839823

Iteration 103, Compliance =17.3847, Volume=95.0258