IsoValue -1.10097 -1.02425 -0.947524 -0.870802 -0.794081 -0.717359 -0.640638 -0.563916 -0.487195 -0.410473 -0.333751 -0.25703 -0.180308 -0.103587 -0.0268654 0.0498561 0.126578 0.203299 0.280021 0.356742

Initial shape, Compliance 39.9929, Volume 95