IsoValue -0.576036 -0.535895 -0.495753 -0.455612 -0.41547 -0.375329 -0.335188 -0.295046 -0.254905 -0.214763 -0.174622 -0.134481 -0.0943391 -0.0541977 -0.0140562 0.0260852 0.0662266 0.106368 0.146509 0.186651

Iteration 3, Compliance =40.9917, Volume=97.2869