IsoValue -0.296753 -0.225856 -0.154958 -0.08406 -0.0131623 0.0577354 0.128633 0.199531 0.270429 0.341326 0.412224 0.483122 0.55402 0.624917 0.695815 0.766713 0.837611 0.908508 0.979406 1.0503

Initial shape, Pression/Compliance -0.12175, Volume -1