IsoValue -0.797911 -0.607281 -0.416651 -0.226021 -0.0353908 0.155239 0.345869 0.536499 0.727129 0.917759 1.10839 1.29902 1.48965 1.68028 1.87091 2.06154 2.25217 2.4428 2.63343 2.82406

Iteration 3, Compliance =1.13914, Volume=20.5194